From c96d0c3870ffa386f7af22ba88c4649b2808f3f0 Mon Sep 17 00:00:00 2001
From: LV-426 <lv-426@taproot.org.il>
Date: Mon, 5 Jan 2015 20:26:58 +0200
Subject: fix README.mediawiki commit

---
 README.mediawiki | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
index fedccc1a..5ad0fa2a 100644
--- a/README.mediawiki
+++ b/README.mediawiki
@@ -45,4 +45,6 @@ To rebuild the css files issue make from the top level directory:
 Test code makes use of Python's unittest - run by invoking them with python,
 or by creating a launch configuration in your IDE of choice.
 
+Note: server test-cases do not yet support pre-run DB state validation and are
 likely to leave DB side-effects.
+
-- 
cgit v1.3.1

