From 89b8328253693333b2d8b3075c4218798b00e56d Mon Sep 17 00:00:00 2001
From: LV-426 <lv-426@taproot.org.il>
Date: Mon, 5 Jan 2015 12:15:48 +0200
Subject: adapt to rhizi_server.py -> rz_server.py rename

---
 README.mediawiki | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
index 5e5e8402..990e4b75 100644
--- a/README.mediawiki
+++ b/README.mediawiki
@@ -21,10 +21,10 @@ For testing locally run neo4j locally on the default 7474 port and then launch r
 Or perform the following tasks by hand:
 # Invoke the local deployment Ant target:<br><code>$ cd ./rhizi && ant -f build.ant deploy-local</code>
 # Assert Neo4J is running and listening on it's default port
-# Run rhizi-server.py:<br><code>$ cd deploy-local && python bin/rhizi_server.py --config-dir=etc</code>
+# Run rhizi-server.py:<br><code>$ cd deploy-local && python bin/rz_server.py --config-dir=etc</code>
 
 Command line use documentation can be view with:
-:$ python rhizi_server.py -h
+:$ python rz_server.py -h
 = Development =
 To update the css files you need [sass](http://sass-lang.com/)
 
-- 
cgit v1.3.1

