From 81fc4788df163e3fa807f6335bec3808aaeb4e26 Mon Sep 17 00:00:00 2001
From: LV-426 <lv-426@taproot.org.il>
Date: Mon, 5 Jan 2015 18:19:57 +0200
Subject: README.mediawiki: server tests note

---
 README.mediawiki | 1 +
 1 file changed, 1 insertion(+)

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
index 990e4b75..fedccc1a 100644
--- a/README.mediawiki
+++ b/README.mediawiki
@@ -45,3 +45,4 @@ To rebuild the css files issue make from the top level directory:
 Test code makes use of Python's unittest - run by invoking them with python,
 or by creating a launch configuration in your IDE of choice.
 
+likely to leave DB side-effects.
-- 
cgit v1.3.1

