From 6e38f80495ecd99d6bea11c157f9cfb2831a177d Mon Sep 17 00:00:00 2001
From: tekkub <tekkub@gmail.com>
Date: Tue, 23 Jun 2009 17:43:41 -0600
Subject: FI tweak

---
 _posts/2009-06-23-security.textile | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to '_posts/2009-06-23-security.textile')

diff --git a/_posts/2009-06-23-security.textile b/_posts/2009-06-23-security.textile
index 49fb472..f9a7b3d 100644
--- a/_posts/2009-06-23-security.textile
+++ b/_posts/2009-06-23-security.textile
@@ -30,4 +30,4 @@ We protect your login from brute force attacks with rate limiting.  All password
 
 We keep a security consultant on retainer to help identify and prevent new attack vectors.  We always test new features in order to cut out potential attacks, such as XSS-protecting wikis, and ensuring that Pages cannot access cookies.
 
-We're extremely concerned and active about security, but we're aware that many companies are not comfortable putting their code under someone else's control.  For these companies we offer "GitHub:FI":http://fi.github.com/, a version of GitHub that can be installed to a server within the company's network.
\ No newline at end of file
+We're extremely concerned and active about security, but we're aware that many companies are not comfortable hosting code outside their firewall. For these companies we offer our "Firewall Install":http://fi.github.com/, a version of GitHub that can be installed to a server within the company's network.
\ No newline at end of file
-- 
cgit v1.3.1

